\hypertarget{structvec2__uint16}{}\doxysection{vec2\+\_\+uint16 Struct Reference}
\label{structvec2__uint16}\index{vec2\_uint16@{vec2\_uint16}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structvec2__uint16_a58bb02338aebf7798ed13083eedb64b7}\label{structvec2__uint16_a58bb02338aebf7798ed13083eedb64b7}} 
\begin{tabbing}
xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=\kill
union \{\\
\mbox{\Hypertarget{unionvec2__uint16_1_1_0d9_a531ff170dd49606c90ba2e44c956bbea}\label{unionvec2__uint16_1_1_0d9_a531ff170dd49606c90ba2e44c956bbea}} 
\>struct \{\\
\>\>uint16\_t {\bfseries x}\\
\>\>uint16\_t {\bfseries y}\\
\>\} \\
\>uint16\_t {\bfseries data} \mbox{[}2\mbox{]}\\
\}; \\

\end{tabbing}\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/toolbox/vec2/vec2\+\_\+uint16.\+h\end{DoxyCompactItemize}
